0 5 10 15 20 25 30 -40

-30

-20

-10

0

10

20

30

40

time(s)

Phantom´s (mm)

x (Force feedback) x Fanuc axis

0 5 10 15 20 25 30 -40

-30

-20

-10

0

10

20

30

40

time(s)

z (Force feedback) z Fanuc axis