\chapter{Layers of the amplification shield}
\clearpage
\begin{figure}[H]
	  \centering 
	  \includegraphics[width=0.85\textwidth]{imgs/Appendix/Bottomlayer.png}
	 \caption{Bottom layer of the amplification shield}
	 \end{figure}
	 
	 
	 \begin{figure}[H]
	  \centering 
	  \includegraphics[width=0.85\textwidth]{imgs/Appendix/Toplayer.png}
	 \caption{Top layer of the amplification layer}
	 \end{figure}