\def\logoname{LOGO-jsen-web}
\definecolor{subsectioncolor}{rgb}{0,0.44706,0.40392}
\setlength{\firstpagerule}{35.85pc}
\setlength{\logowidth}{7.15pc}
\def\journalname{IEEE Sensors Journal}
