-1 0 1 -1 0 1 2 Data points

theta θ rho ρ

Hough Transform for first set

45 90 135 180 225 270 315 360

-2.25 -1.5 -0.75 0 0.75 1.5 2.25 3

theta θ ρ

Hough Transform for second set

45 90 135 180 225 270 315 360

-2.25 -1.5 -0.75 0 0.75 1.5 2.25 3

0 45 90 135 180 225 270 315 360 0

0.5

1

theta θ

Hough spectra

0 45 90 135 180 225 270 315 360 0

0.5

1

theta θ

Spectra cross-correlation