T buffer forϕ=267 (filtered)

-1 0 1 -1 0 1 T=-0.93;-0.21

-2 -1 0 1 -1 0 1 T=0.48;-0.51

T buffer forϕ=87 (filtered)

-1 0 1 -1 0 1 T=0.87;0.24