T buffer forϕ=234 (filtered)

-0.5 0 0.5

-0.5 0 0.5 T=0.075;0.09

-0.5 0 0.5

-0.2 0 0.2 0.4 0.6 0.8 T=0.135;-0.36

T buffer forϕ=54 (filtered)

-0.5 0 0.5

-0.2 0 0.2 0.4 0.6 T=-0.12;-0.24

-0.4-0.200.20.40.60.8

-0.2 0 0.2 0.4 0.6 T=-0.375;-0.27