T buffer forϕ=296 (filtered)

-2 0 2 -1 0 1 T=0.84;0.24

-2 0 2 -1 0 1 2 T=0.24;-0.72

T buffer forϕ=116 (filtered)

-2 0 2 -1 0 1 T=-0.66;0.3

-2 0 2 -1 0 1 T=-0.54;-0.66

T buffer forϕ=258 (filtered)

-2-1 0 1 -1 0 1 T=0.12;0.72

-2-1 0 1 -1 0 1 2 T=0.72;0.48

T buffer forϕ=78 (filtered)

-2-1 0 1 -2 -1 0 1 T=-0.18;-0.24

-2 0 2 -2 -1 0 1 T=-0.66;-0.12